% Save file as: VARFBOX.STY            Source: FILESERV@SHSU.BITNET  
\typeout{Document Sub-Style 'varfbox', Version 1 (August 8, 1989) GDG}
\newdimen\holdrule

\edef\Fbox#1#2{\holdrule=\fboxrule
\fboxrule=#1mm \fbox{#2} \fboxrule=\holdrule}

% Usage: \Fbox{foo}{Text to box}
% This is a short style file which allows the user to specify the size of
% \fboxrule (in mm) as they use the \fbox environment by specifying \Fbox
%
% foo is the number of millimeters the \fboxrule should be set to for
% that box.
%
% \fboxrule for normal \fbox environment is not changed.
%
% Author: George D. Greenwade, Director, Center for Business and Economic
%   Research, sam Houston State University, Huintsville, TX (409) 294-1518
%   BITNET: BED_GDG@SHSU
% Revision History:  8-AUG-1989  Original Version  GDG
